sin(2β) ( sin(2ϕ_1)

-2 -1 0 1 2 3

BaBar hep-ex/0607107

0.71 Α 0.03 Α 0.02

Belle hep-ex/0608039

0.64 Α 0.03 Α 0.02

ALEPH PLB 492, 259-274 (2000)

0.84 ^+_-^0_1^.^8_0^2_4 Α 0.16

OPAL EPJ C5, 379-388 (1998)

3.20 ^+_-^1_2^.^8_0^0 Α 0.50 CDF PRD 61, 072005 (2000)

0.79 ^+_-^0^.^4^1_4

Average HFAG

0.68 Α 0.03

HFAG

ICHEP 2006 PRELIMINARY