J/ψ π^0 S_{CP}

HFAG

ICHEP 2006

-1.8 -1.6 -1.4 -1.2 -1 -0.8 -0.6 -0.4 -0.2 0 0.2

BaBar

PRD 74 011101 (2006)

-0.68 Α 0.30 Α 0.04

Belle

PRL 93, 261801 (2004)

-0.72 Α 0.42 Α 0.09

Average

HFAG correlated average

-0.68 Α 0.25

HFAG

ICHEP 2006 PRELIMINARY