D*π N(σ)_{min}

0 20 40 60 80 100 120 140 160 180

0 0.005 0.01 0.015 0.02 0.025 0.03 0.035 0.04

1

2

3

4

5

R

2β+γ ( 2ϕ_1+ϕ_3 (˚)

HFAG

ICHEP 2006 PRELIMINARY