D^{(*)}h^0 sin(2β) ( sin(2ϕ_1)

HFAG

ICHEP 2006

-0.4 -0.2 0 0.2 0.4 0.6 0.8 1 1.2

BaBar

hep-ex/0607105

0.45 Α 0.36 Α 0.05 Α 0.07

Belle

PRL 97, 081801 (2006)

0.78 Α 0.44 Α 0.22

Average

HFAG

0.57 Α 0.30

HFAG

ICHEP 2006 PRELIMINARY