-1.25 -1 -0.75 -0.5 -0.25 0 0.25 0.5 0.75 1 1.25

–η_fΞS_f

(dc-bar)c s-penguin

Charmonium J/ψπ^0 D*^+D*^– D*^+D^– D*^–D^+ ϕK^0 η^,K^0_S f_0K^0_S π^0K^0_S ωK^0_S K^+K^–K^0_S K^0_SK^0_SK^0_S Average (s-penguin)

0.726Α0.037

0.40Α0.33

0.20Α0.32

0.61Α0.36

0.75Α0.38

0.34Α0.20

0.41Α0.11

0.39Α0.26

0.34^{+ 0.27}_{– 0.29}

0.75Α0.64^{+ 0.13}_{– 0.16}

0.53Α0.17

–1.26Α0.68Α0.18

0.41Α0.07 0.41Α0.07

HFAG

FPCP 2004