-2 -1.5 -1 -0.5 0 0.5 1 1.5 –η_fΞS_f

Charmonium ϕK^0 η^,K^0_S f_0K^0_S π^0K^0_S ωK^0_S

KKK^0_S

K^0_SK^0_SK^0_S

BABAR 04 Belle 04 Average (charmonium - all exps.) BABAR 04 Belle 04 BABAR 04 Belle 04 BABAR 04 Belle 04 BABAR 04 Belle 04 Belle 04 BABAR 04 Belle 04 Belle 04 Average (s-penguin)

0.722Α0.040Α0.023 0.728Α0.056Α0.023 0.726Α0.037 0.50Α0.25^{+ 0.07}_{– 0.04} 0.06Α0.33Α0.09 0.27Α0.14Α0.03 0.65Α0.18Α0.04 0.95^{+ 0.23}_{– 0.32} Α0.10 –0.47Α0.41Α0.08 0.35^{+ 0.30}_{– 0.33} Α0.04 0.30Α0.59Α0.11 0.75Α0.64^{+ 0.13}_{– 0.16} 0.55Α0.22Α0.12 0.49Α0.18^{+ 0.17}_{– 0.04} –1.26Α0.68Α0.18 0.41Α0.07 0.41 Α 0.07

HFAG

FPCP 2004