-2 -1.75 -1.5 -1.25 -1 -0.75 -0.5 -0.25 0 S_{ππ}

Average (ICHEP 04)

BABAR (Summer 2004)

Belle (Winter 2004)

Average

–0.30Α0.17Α0.03

–1.00Α0.21Α0.07

–0.61Α0.14

-0.61Α0.14 HFAG

FPCP 2004