-1 -0.75

-0.5

-0.25 0 0.25 0.5 0.75

-1 -0.75 -0.5 -0.25 0 0.25 0.5 0.75 1

1σ 2σ 3σ

A^{– +}_{ρπ}

A^{+ –}_{ρπ}

HFAG

ICHEP 2004