|_{us} |V 0.215 0.22 0.225 decays, FlaviaNet 2010 l3K 0.0013 ± 0.2254

decays, FlaviaNet 2010 l2K 0.0013 ± 0.2252 CKM unitarity

0.0010 ± 0.2255 , HFAG 2012 νπ→τ /ν K→τ 0.0021 ± 0.2229

, HFAG 2012 ν K →τ 0.0022 ± 0.2214

s inclusive, HFAG 2012 →τ 0.0022 ± 0.2173 average, HFAG 2012 τ 0.0015 ± 0.2202

HFAG-Tau

Winter 2012