0 0.5 1 1.5 2

BELLE untag 0.37 ± 0.40 ± 1.30 BABAR untag (loose nu-reco) 0.08 ± 0.16 ± 1.19 BABAR untag 0.08 ± 0.14 ± 1.12 BELLE had.tag 0.07 ± 0.16 ± 1.07 BABAR sl.tag 0.11 ± 0.21 ± 1.35 Average

0.10 ± 1.19

HFLAV

2021 /dof = 0.98/ 4 (CL = 91.2 %) 2χ