2− 0 2

CLEO 0.560 ± 0.800 ± 2.710 BABAR sl.tag 0.040 ± 0.220 ± 0.040 BABAR untagged (loose nu-reco) 0.030 ± 0.080 ± 0.240 BELLE had.tag 0.040 ± 0.270 ± 0.360 BELLE untagged 0.030 ± 0.129 ± 0.279 Average

0.067 ± 0.249

HFLAV

2021 /dof = 7.47/ 4 (CL = 11.3 %) 2χ