]^{-3}

| [10 cb F(1) |V EWη 25 30 35 40

ALEPH 1.2 ± 1.8 ± 31.4 CLEO 1.5 ± 1.2 ± 40.2 OPAL excl 1.5 ± 1.6 ± 36.2 OPAL partial reco 2.3 ± 1.2 ± 37.4 DELPHI partial reco 2.3 ± 1.4 ± 35.5 DELPHI excl 2.0 ± 1.7 ± 35.9 BELLE 0.6 ± 0.2 ± 34.8 BABAR excl 1.0 ± 0.3 ± 33.8 BABAR D*0 1.1 ± 0.6 ± 34.5 BABAR global fit 1.1 ± 0.2 ± 35.5 Average 0.3 ± 0.1 ± 35.0

HFLAV

2021

/dof = 42.2/23 (CL = 0.90 %) 2χ