0 0.1 0.2 0.3 0.4 0.5

f_s(Υ(5S))

Average for PDG 2008 0.193 Α0.029

BELLE D^0X (1.86 fb^{-1})

0.181 Α0.036 Α0.075

BELLE D_sX (1.86 fb^{-1})

0.179 Α0.014 Α0.041

CLEO BBX (0.423 fb^{-1})

0.412 Α0.100 Α0.093

CLEO ϕX (0.423 fb^{-1})

0.247 Α0.028 Α0.102

CLEO D_sX (0.423 fb^{-1})

0.169 Α0.026 Α0.059

Heavy Flavour Averaging Group