) in ps

0(Bτ

1.45 1.5 1.55 1.6

-1 in ps d m Δ

0.48

0.5

0.52

HFAG

PDG 2006

BABAR_{νl*D}

23M BB

BABAR_{part. reco.}

νl^*D 88M BB

BELLE_{νl*}

full hadr. + D 152M BB

Average

= 1 2χΔ stat only stat + syst