-1

-0.5

0

0.5

1

1.5

2

2.5

0 2 4 6 8 10 12 14 16 18 20

Δm_s (ps^{-1})

Amplitude

data Α 1 σ 95Ψ CL limit 14.1 ps^{-1} 1.645 σ sensitivity 15.3 ps^{-1}

data Α 1.645 σ data Α 1.645 σ (stat only)

Average for PDG 2003