0.4 0.45 0.5 0.55

Δm_d (ps^{-1}) world average 0.502Α0.007 ps^{-1}

ARGUS+CLEO (χ_d measurements)

0.492Α0.032 ps^{-1} average of above after adjustments

0.502Α0.007 ps^{-1}

BELLE ^* (4 analyses)

0.506Α0.006Α0.008 ps^{-1}

BABAR ^* (3 analyses)

0.500Α0.008Α0.006 ps^{-1}

CDF ^* (4 analyses)

0.495Α0.033Α0.027 ps^{-1}

OPAL (5 analyses)

0.479Α0.018Α0.015 ps^{-1} L3 (3 analyses)

0.444Α0.028Α0.028 ps^{-1}

DELPHI ^* (5 analyses)

0.519Α0.018Α0.011 ps^{-1}

ALEPH (3 analyses)

0.446Α0.026Α0.019 ps^{-1}

* working group average without adjustments