0

0.002

0.004

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

ΔΓ_s/Γ_s

Probability density

68% C.L. region 95% C.L. region 99% C.L. region

CDF, LEP average